#
# ChangeLog for tags/rel-1.5.0/zoo-project/zoo-kernel/sql/schema.sql
#
# Generated by Trac 1.0.4
# Jul 5, 2024, 6:40:03 AM

Fri, 10 Jul 2015 12:43:05 GMT djay [737]
	* tags/rel-1.5.0 (copied)
	* tags/rel-1.5.0/docs (copied)
	* tags/rel-1.5.0/docs/contribute/release.rst (copied)
	* tags/rel-1.5.0/zoo-project (copied)
	* tags/rel-1.5.0/zoo-project/zoo-kernel/Makefile.in (copied)
	* tags/rel-1.5.0/zoo-project/zoo-kernel/sqlapi.c (copied)

	Created tag for the 1.5.0 release


Fri, 03 Jul 2015 18:32:18 GMT djay [732]
	* branches/branch-1.5 (copied)
	* trunk/workshop/2010/images/3liz-logo.png (deleted)
	* trunk/workshop/2010/images/apptech-logo.png (deleted)
	* trunk/workshop/2010/images/gateway-logo.png (deleted)
	* trunk/workshop/2010/images/geolabs-logo.png (deleted)
	* trunk/workshop/2010/images/neogeo-logo.png (deleted)
	* trunk/workshop/2012/images/3liz-logo.png (deleted)
	* trunk/workshop/2012/images/apptech-logo.png (deleted)
	* trunk/workshop/2012/images/gateway-logo.png (deleted)
	* trunk/workshop/2012/images/geolabs-logo.png (deleted)
	* trunk/workshop/2012/images/neogeo-logo.png (deleted)
	* trunk/workshop/2013/images/3liz-logo 2.png (deleted)
	* trunk/workshop/2013/images/3liz-logo.png (deleted)
	* trunk/workshop/2013/images/apptech-logo 2.png (deleted)
	* trunk/workshop/2013/images/apptech-logo.png (deleted)
	* trunk/workshop/2013/images/gateway-logo 2.png (deleted)
	* trunk/workshop/2013/images/gateway-logo.png (deleted)
	* trunk/workshop/2013/images/geolabs-logo.png (deleted)
	* trunk/workshop/2013/images/neogeo-logo 2.png (deleted)
	* trunk/workshop/2013/images/neogeo-logo.png (deleted)
	* trunk/workshop/2014/images/3liz-logo.png (deleted)
	* trunk/workshop/2014/images/apptech-logo.png (deleted)
	* trunk/workshop/2014/images/gateway-logo.png (deleted)
	* trunk/workshop/2014/images/geolabs-logo.png (deleted)
	* trunk/workshop/2014/images/neogeo-logo.png (deleted)
	* tags/rel-1.5.0 (copied)
	* trunk/workshop/2010/images/3liz-logo.png (deleted)
	* trunk/workshop/2010/images/apptech-logo.png (deleted)
	* trunk/workshop/2010/images/gateway-logo.png (deleted)
	* trunk/workshop/2010/images/geolabs-logo.png (deleted)
	* trunk/workshop/2010/images/neogeo-logo.png (deleted)
	* trunk/workshop/2012/images/3liz-logo.png (deleted)
	* trunk/workshop/2012/images/apptech-logo.png (deleted)
	* trunk/workshop/2012/images/gateway-logo.png (deleted)
	* trunk/workshop/2012/images/geolabs-logo.png (deleted)
	* trunk/workshop/2012/images/neogeo-logo.png (deleted)
	* trunk/workshop/2013/images/3liz-logo 2.png (deleted)
	* trunk/workshop/2013/images/3liz-logo.png (deleted)
	* trunk/workshop/2013/images/apptech-logo 2.png (deleted)
	* trunk/workshop/2013/images/apptech-logo.png (deleted)
	* trunk/workshop/2013/images/gateway-logo 2.png (deleted)
	* trunk/workshop/2013/images/gateway-logo.png (deleted)
	* trunk/workshop/2013/images/geolabs-logo.png (deleted)
	* trunk/workshop/2013/images/neogeo-logo 2.png (deleted)
	* trunk/workshop/2013/images/neogeo-logo.png (deleted)
	* trunk/workshop/2014/images/3liz-logo.png (deleted)
	* trunk/workshop/2014/images/apptech-logo.png (deleted)
	* trunk/workshop/2014/images/gateway-logo.png (deleted)
	* trunk/workshop/2014/images/geolabs-logo.png (deleted)
	* trunk/workshop/2014/images/neogeo-logo.png (deleted)

	Created branch/tags for the 1.5.0 release candidate 1.


